mc1_random_x.def

y x

Obs:   40 

The x-values and y-values are simulated data. The true model is y = 100 + 10*x + e, e has N(0, 2500) distribution; the x variable has N(15, 2.56) distribution


variable  	label
---------------------------------------------------------------------------------------------------------------------------------------------------------
y		y-variable
x		x-variable


    Variable |       Obs        Mean    Std. Dev.       Min        Max
-------------+--------------------------------------------------------
           y |        40    265.7423    52.71332   149.6558   366.5948
           x |        40    15.26218    1.487859   10.94196   18.47466



