euro.def

  r

   r : returns to the Dow Jones Euro Share price Index: STOXX300

  Obs: 204, monthly (1988:01-2004:12)  


Data source: http://au.finance.yahoo.com  


    Variable |       Obs        Mean    Std. Dev.       Min        Max
-------------+--------------------------------------------------------
       r     |       204    .7867549    5.192137  -17.74131   14.57551

              
